)c (GeV/ Tp 1 2 3 4 5 6 7 8

efficiency × Acceptance

0

0.2

0.4

0.6

0.8

1

d d Fit d d Fit

= 2.76 TeV NNs ALICE 0-10% Pb-Pb

TPC-TOF

10 × HMPID